

-- -----------------------------------------
-- #5612
-- -----------------------------------------
ALTER TABLE icinga_statehistory ADD COLUMN check_source varchar(255) character set latin1 default NULL;

-- -----------------------------------------
-- #5731
-- -----------------------------------------
ALTER TABLE icinga_conninfo MODIFY agent_version VARCHAR(32);
ALTER TABLE icinga_conninfo MODIFY disposition VARCHAR(32);
ALTER TABLE icinga_conninfo MODIFY connect_source VARCHAR(32);
ALTER TABLE icinga_conninfo MODIFY connect_type VARCHAR(32);

-- --------------------------------------------------------
-- Icinga 2 specific schema extensions
-- --------------------------------------------------------

--
-- Table structure for table icinga_endpoints
--

CREATE TABLE IF NOT EXISTS icinga_endpoints (
  endpoint_id bigint(20) unsigned NOT NULL AUTO_INCREMENT,
  instance_id bigint unsigned default 0,
  endpoint_object_id bigint(20) unsigned DEFAULT '0',
  config_type smallint(6) DEFAULT '0',
  identity varchar(255) DEFAULT NULL,
  node varchar(255) DEFAULT NULL,
  PRIMARY KEY  (endpoint_id)
) ENGINE=InnoDB COMMENT='Endpoint configuration';

-- --------------------------------------------------------

--
-- Table structure for table icinga_endpointstatus
--

CREATE TABLE IF NOT EXISTS icinga_endpointstatus (
  endpointstatus_id bigint(20) unsigned NOT NULL AUTO_INCREMENT,
  instance_id bigint unsigned default 0,
  endpoint_object_id bigint(20) unsigned DEFAULT '0',
  status_update_time timestamp NOT NULL DEFAULT '0000-00-00 00:00:00',
  identity varchar(255) DEFAULT NULL,
  node varchar(255) DEFAULT NULL,
  is_connected smallint(6),
  PRIMARY KEY  (endpointstatus_id)
) ENGINE=InnoDB COMMENT='Endpoint status';


ALTER TABLE icinga_servicestatus ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_hoststatus ADD COLUMN endpoint_object_id bigint default NULL;

ALTER TABLE icinga_acknowledgements ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_commenthistory ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_contactnotifications ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_downtimehistory ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_eventhandlers ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_externalcommands ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_flappinghistory ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_hostchecks ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_logentries ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_notifications ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_processevents ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_servicechecks ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_statehistory ADD COLUMN endpoint_object_id bigint default NULL;
ALTER TABLE icinga_systemcommands ADD COLUMN endpoint_object_id bigint default NULL;

-- -----------------------------------------
-- set dbversion
-- -----------------------------------------
INSERT INTO icinga_dbversion (name, version, create_time, modify_time) VALUES ('idoutils', '1.11.0', NOW(), NOW()) ON DUPLICATE KEY UPDATE version='1.11.0', modify_time=NOW();

