
////////////////////////////////////////////////////////////////////
///// The content about individual configuration options has been
///// moved to the following files:
///// generalconfig.asciidoc for General options
///// outputconfig.asciidoc for Output options
///// loggingconfig.asciidoc for Logging options
///// runconfig.asciidoc for Run Configuration options
///// The content now appears in the guides for each Beat. You can
///// include the content in the guide for your Beat by using the
///// following asciidoc include statements:
///// include::../../libbeat/docs/outputconfig.asciidoc[]
///// include::../../libbeat/docs/generalconfig.asciidoc[]
///// include::../../libbeat/docs/loggingconfig.asciidoc[]
////////////////////////////////////////////////////////////////////

[[installing-beats]]
=== Install Beats

After <<getting-started,installing and configuring>> the Elastic stack, you need to install and configure your Beat.

Each Beat is a separately installable product. To get up and running quickly with a Beat, see the Getting Started information for your Beat:

* {packetbeat}/packetbeat-getting-started.html[Packetbeat]
* {metricbeat}/metricbeat-getting-started.html[Metricbeat]
* {filebeat}/filebeat-getting-started.html[Filebeat]
* {winlogbeat}/winlogbeat-getting-started.html[Winlogbeat]
* {heartbeat}/heartbeat-getting-started.html[Heartbeat]


